Scale NC_024797.1:

Bra1 Genes Conserved TFBS FunTFBS Simple Repeats

1 kb bra1 1,440,500 1,441,000 1,441,500 1,442,000 1,442,500 1,443,000 1,443,500 1,444,000 1,444,500 Brassica rapa gene annotation (bra1) Brassica rapa conserved TFBS Brassica rapa FunTFBS Simple Tandem Repeats by TRF